Centrality (%)

0 10 20 30 40 50 60 70 slope parameter

0.01 - 0 0.01

0.02

0.03

0.04

0.05

0.06 = 2.76 TeV NNs ALICE, Pb-Pb at = 200 GeV NNs STAR, Au-Au at